-4.5

-4.1-3.7-3.3-2.9-2.5-2.1-1.7-1.3-0.9-0.5-1.0-0.6-0.20.20.61.01.41.82.22.63.00.580.590.650.821.131.661.662.442.443.533.534.986.849.1712.01

Contour Plot of g(u, v) uv