1020304050607080901008.000e-08

2.720e-07

4.640e-07

6.560e-07

8.480e-07

1.040e-06

1.232e-06

1.424e-06

1.616e-06

1.808e-06

2.000e-06

Comparison of sets

L1, L2, and L3

Temperature / K

Voltage / V

Set L1

Set L2

Set L3